| [degrees] ϕ| 0 20 40 60 80 100 120 140 160 180

CA

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 H1preliminary^{H1 HERA II (prelim.)}_{ϕ0.16 cosGPDs model}