]^2 t [GeV

-1.0 -0.8 -0.6 -0.4 -0.2 0.0 0.2

(t) α

0.90

0.95

1.00

1.05

1.10

1.15

H1 PRELIMINARY

Omega+H1+ZEUS Data Correlated Errors Linear Pomeron Fit Donnachie & Landshoff

Photoproduction 0ρ Elastic