]^2

[GeV 2Q 310^410

(HERAPDF 1.0) 2 /dQ σ / d 2 /dQ σd

1

1.5

= 0.0% eP y < 0.9

HERA I+II

H1 Preliminary

p NC + H1 e H1PDF 2009 CTEQ 6m

HERAPDF 1.0 Uncert.

310 0.9

1

1.1