0 0.5 1 0

0.2

0.4

0.6

0.8

Xν→p^+

H1 e H1PDF 2009 = -37.6% eP

x -2 10^{-1}10

0.05

0.1

0.15 2 = 15000 GeV 2Q

x -2 10^{-1}10

0.05

0.1

0.15 2 = 8000 GeV

2Q x -2 10^{-1}10

0.1

0.2

0.3

0.4

HERA II

2 = 5000 GeV 2Q

x -2 10^{-1}10

0.1

0.2

0.3

0.4 2

= 3000 GeV 2Q

x -2 10^{-1}10

0.1

0.2

0.3

0.4^2 = 2000 GeV

2Q x -2 10^{-1}10

0.5

1 H1 Preliminary 2 = 1000 GeV 2Q

x -2 10^{-1}10

0.5

1 2 = 500 GeV 2Q

x -2 10^{-1}10

0.5

1 CCσ∼^2

= 300 GeV 2Q