])^2

[GeV h 2(Q 10 log 2.0 2.5 3.0 3.5 4.0 4.5 5.0

Events

100 200 300 400 500 600 700 800 900

[GeV]

T,hP

0 10 20 30 40 50 60 70 80 90 100

Events

200 400 600 800 1000

H1 Preliminary

p CC Data _ H1 e MC (CC + Bkg) MC (Bkg)

= -26.0% eP

[GeV] z E-P 0 10 20 30 40 50 60

Events

100 200 300 400 500 600 700

)_h(x_{10} log -2.0 -1.5 -1.0 -0.5 0.0

Events

100 200 300 400 500 600

HERA II