-410 0.8 1 1.2 1.4^2

= 5.0 GeV 2Q

-410 0.8 1 1.2 1.4^2

= 5.0 GeV 2Q

-410 0.8 1 1.2 1.4^2

= 5.0 GeV 2Q

-410 0.8 1 1.2 1.4^2

= 5.0 GeV

2Q^2 2Q

x

, y)^2

(x, Q rσ

H1 Preliminary

H1 Data^{H1PDF 2009} rσ = 920 GeV pE = 575 GeV pE = 460 GeV pE = 920 GeV pE = 575 GeV pE = 460 GeV pE H1PDF 2009 2F

0.8

1

1.2

1.4

0.8 1

1.2

1.4^{-4}10^{-4}10

-4 10