0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00006

0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00007

0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00008

0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00009

0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00011

0 0.2 0.4 0.6 0.8 0.8

1 x = 0.00014

+ / Y 2y

, y)^2

(x, Q rσ

H1 Preliminary

H1 data

2 = 3.5 GeV 2Q

= 920 GeV pE = 575 GeV pE = 460 GeV pE Linear fit

0.8

1

0.8

1

0 0.2 0.4 0.6 0.8 0 0.2 0.4 0.6 0.8 0 0.2 0.4 0.6 0.8