10^210 0

0.5

1 = 460, 575, 920 GeV pE

0.000059 0.000087

0.00013 0.00017 0.00021 0.00029 0.00040 0.00052 0.00067 0.00090 0.0011 0.0015

0.0023

x

H1 (Prelim.)

H1PDF 2009 CTEQ 6.6M Alekhin NNLO MSTW NLO MSTW NNLO

L H1 Preliminary F

2 / GeV 2Q

)^2

(x, Q LF

0

1