[GeV]

Squark M 100 120 140 160 180 200 220 240 260 280

Branching Ratio at Limit

-1 10

1 eq, qν

MJ, +e MJ^- e

H1 Preliminary sum

= 90 GeV

slepton M = 80 GeV 2M = -200 GeV μ = 2 β tan