[GeV] X TP 0 10 20 30 40 50 60 70 80 90 100

[fb/GeV] X T /dP Wσd

1

10

210

X

X T

1

210^{)-1}

H1+ZEUS (0.98 fb SM Signal

Single W Production at HERA (Preliminary)

X

X T

1