) [GeV]

-π ^+π M ( 0.3 0.4 0.5 0.6 0.7

Entries / 3 MeV

0

1000

2000

3000

4000

5000 -π ^+π→ _s^0K

1194 ± ) = 38154 s 0 N(K

H1 Preliminary