1

1.2

1.4

1.6

0.5 1

X=0.00060

Q^2=32 GeV^2 σ_r(x,Q^2,y)

1

1.2

1.4

1.6

0.5 1

X=0.00067

1

1.2

1.4

1.6

0.5 1

X=0.00074

H1 and ZEUS

1

1.2

1.4

1.6

0.5 1

X=0.00084

1

1.2

1.4

1.6

0.5 1

X=0.00097

1

1.2

1.4

1.6

0.5 1

X=0.00129

y^2/(1+(1-y)^2)

HERA prel.

E_p=920 GeV E_p=575 GeV E_p=460 GeV Linear fit

HERA Inclusive Workging Group March 2010