-0.2 0 0.2 0.4

10 10^2 Q2 / GeV2

F_L

0.000059 0.000087 0.000128 0.000168 0.000231 0.000324 0.000404 0.000534 0.000641 0.000855 0.001215 0.001599 0.002113 0.002927 0.003795 0.005420 0.006843 0.009109 0.012250 0.020170 0.026220 0.032270

x

HERA preliminary

H1 and ZEUS

HERA Inclusive Working Group April 2010

NNLO α_S=0.1176 NNLO α_S=0.1146