[GeV]

Squark M 100 120 140 160 180 200 220 240 260 280

(j=1,2) 1j1 ’λ Branching Ratio at Limit for

-1 10

1 eq

MJ, +e MJ^- e

MJ ν elMJ lMJ ν sum =2, β tan =200 GeV, μ =150 GeV, 2M =90 GeV l ~ M