0 2 4 6 8 10 12

0.4 0.5 0.6 0.7 0.8 0.9

x_L b ΜGeV^{-2}Ν

H1 Data (Prel.) KPP Bishari Holtmann GKS FMS-monopole FMS-dipole

H1 Preliminary