/ GeV

model cm 1.2 1.3 1.4 1.5 1.6 1.7 1.8

2χ

520 540 560 580 600 620 640 660 680

flexible param standard param

/ndf 2χ

0.9 0.95 1 1.05 1.1 1.15

H1 and ZEUS (prel.)

HERAPDF1.0 RT standard

0.100 GeV ± (opt)=1.308

model cm