/ GeV

model cm 1.2 1.4 1.6 1.8

/ nb +Wσ

52 54 56 58 60 62 64

RT standard RT optimised ACOT-full χ S-ACOT- ZMVFNS

) = 7 TeV

s (^+W

(prel.) cc 2 HERAPDF1.0 + F

HERA Inclusive Working Group August 2010