/ GeV

model cm 1.2 1.3 1.4 1.5 1.6 1.7 1.8

2χ

1000

1500

2000

flexible param standard param

/ndf 2χ

1 1.5 2 2.5 3 3.5 H1 and ZEUS (prel.)

(prel.) cc 2 HERAPDF1.0 + F χ S-ACOT-

0.015 GeV ± (opt)=1.254

model cm