IPx 0.01 0.015 0.02

(pb) IP /dx σd

0 1000

2000

3000

4000

5000

0

H1 Data (Prel.) NLO DPDF Jets 2007 (x 0.83)

VFPS DIS Dijets

H1 Preliminary