H1 Preliminary

> [GeV] T <P 8 9 10 20

]^{-1}

> [pb GeV T /d<P

trijet σd

-1 10

1

10

T

T

1

Trijet H1 Data (prel.) 0 Z ⊗ _h c⊗

NLO HERAPDF 1.5

> [GeV] T <P 8 9 10 20

Ratio

0.8 1 1.2

T

1