[GeV] 12M 10 20 30 40 50 60 70 80 90 100

3 10 × Events

-2 10

-1 10

1

10

3 ×

1

10 H1 Preliminary

[GeV] 12M 10 20 30 40 50 60 70 80 90 100

Ratio

0.5 1 1.5