[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 7 GeV 2 5 < Q

[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 15 GeV 2 10 < Q

[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 30 GeV 2 20 < Q

[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 100 GeV 2 40 < Q

[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 10 GeV 2 7 < Q

[GeV] TE 10 0.6 0.8 1 1.2 1.4

2 < 20 GeV 2 15 < Q

[GeV] TE 10

0.6 0.8 1 1.2 1.4

2 < 40 GeV 2 30 < Q 10_{[GeV]TE}

H1 data

Eur. Phys. J. C67, 1 (2010)

PDF uncertainty scale uncertainty

H1 and ZEUS (prel.)

HERAPDF Structure Function Working Group March 2011

)_sα HERAPDF1.6 free ⊗ ratio to NLO (NLOJet++