]^{-1} integrated luminosity [pb

0 100 200 300

QEDC,corr / L QEDC,bin L

0.9 1 1.1 1.2

(I) (II) (III) (IV)

H1 preliminary QEDC data period-by-period uncertainty

H1 QED Compton luminosity