-110 0

0.5

1 H1 Preliminary

HERA II

2 = 200 GeV 2 Transformed to Q Zγ 2F

x

H1 prelim. )^2

= 200 GeV 2 PDF fit (Q )^2

= 1500 GeV 2 PDF fit (Q