W [GeV]

100 150 200

DIS σ / n DIS σ

0

0.1

0.2

0.3 H1 Data (prel.)

correlated uncertainty π 1.35*CDM+0.53*Rapgap- π 0.71*Lepto+0.63*Rapgap-

Forward Neutrons

H1 Preliminary