) [GeV]

+π, ^-πM(

0.35 0.4 0.45 0.5 0.55

Entries/3 MeV

0

10000

20000

30000

40000

50000

DST7: 880’713

H1 Preliminary

-π^+π→ _S^0K

1126 ± = 289’528 S 0KN