0

0.2

0.4

0.6

0.8

1

-410^{-3}10^{-2}10^{-1}10 1

HERAPDF1.5 LO (prel.) exp. uncert.

x xf

2 = 100 GeV 2Q H1 and ZEUS HERA I+II Combined PDF Fit

HERA Structure Functions Working Group Sep 2013 vxu

vxd 0.05) × xS (

0.05) × xg (

HERA Inclusive Working Group April 2010

H1 and ZEUS