H1 and ZEUS preliminary

1.14

1.16

1.18

1.2

1.22

1.24

0 5 10 15 20 25 30

Q^2 cut / GeV^2 χ^2/dof

HERAPDF2.0 (prel.) NLO NNLO

χ^2/dof = 1386/1130

χ^2/dof = 1156/1001