) [GeV] c(m_cm

1 1.1 1.2 1.3 1.4 1.5

2χ

0

5

10

15

20

25

30 H1 and ZEUS preliminary 2 = 2.5 - 7.5 GeV 2 ) scan for Q c(m cm