D* in diffractive DIS

)_{IP}(x_{10} log 3− 2.8− 2.6− 2.4− 2.2− 2− 1.8− 1.6−

N(D*)

0

100

200

300

400

500

600 H1 Preliminary

data weighted Rapgap: IP elastic weighted Rapgap: IP p-diss weighted Rapgap: IR elastic

y 0.1 0.2 0.3 0.4 0.5 0.6

N(D*)

0

100

200

300

400

[GeV]

T,D* p 2 3 4 5 6 7 8

N(D*)

0

100

200

300

400

500

D*η 1.5 − 1− 0.5− 0 0.5 1 1.5

N(D*)

0 50 100 150 200 250 300