)_{IP}(x_{10} log 3− 2.5− 2−

) [nb] IP(x 10 /dlog σd

0

0.2

0.4

0.6

0.8 D* in diffractive DIS

H1 Preliminary

data

scale variation

⊕ _cm

NLO QCD, H1 2006 Fit B