qa 1− 0.5− 0 0.5 1

qv

1−

0.5 −

0

0.5

1 C.L.

H1 (prel.) (PDF + 4 couplings), 68% C.L.

H1 (prel.) (PDF + 2 couplings), 68% C.L.

H1 HERA-I, 68% Standard model