[GeV] Wm 80 81 82 83 84

]^{-2} [GeV FG

11.2

11.3

11.4

11.5

11.6

11.7

11.8

11.9

12^{6−}10×

H1 preliminary

C.L.

) 68% F,G W (PDF,m Fit from PDG F ), G W (PDF,m Fit from PDG W ), m F (PDF,G Fit PDG 2014

= 91.1 GeV Zm = 91.2 GeV Zm = 91.3 GeV Zm