) from fit Z(m σ sα 0.11 0.12 0.13

) from fit Z(m s fα

0.11

0.12

0.13 GeV < 15μ

H1 inclusive jets

% C.L. 68

) from fit Z(m σ sα 0.11 0.12 0.13

) from fit Z(m s fα

0.11

0.12

0.13 GeV < 15μ

H1 dijets

2χ Fits using in exp. uncertainty only exp., had. & PDF unc.

) from fit Z(m σ sα 0.11 0.12 0.13

) from fit Z(m s fα

0.11

0.12

0.13 GeV > 15μ

et al. (preliminary) H1 ) from fit Z(m σ sα 0.11 0.12 0.13

) from fit Z(m s fα

0.11

0.12

0.13 GeV > 15μ