) of PDF Z(m sα 0.11 0.12 0.13

) from fit to H1 jets Z(m sα

0.11

0.12

0.13 -fit NNLO sα PDF selection

total unc.

NNLO sα NNPDF3.0 ABMP CT14 HERA2.0 MMHT

et al. (preliminary) H1

H1 jets