Pull

-3 -2 -1 0 1 2 3

Entires

0

10

20

30^{Entries 266}

Mean 0.02392 RMS 0.7668 Underflow 0 Overflow 0 / ndf

2χ 46.42 / 57 Prob 0.8406 Constant 1.04±

13.85 Mean 0.04705 ± 0.02711 Sigma 0.0335 ± 0.7662