M_{π+π−}^{lightest} /GeV

M4π/GeV

0.4 0.6 0.8 1 1.2 0.8 1.2 1.6 2 2.4 2.8

H1 M_{π+π−}^{heavy} /GeV

0.4 0.6 0.8 1 1.2 0.8 1.2 1.6 2 2.4 2.8

H1

M^{(3)}_{π+π−} /GeV

0.4 0.6 0.8 1 1.2 0.8 1.2 1.6 2 2.4 2.8

H1 M^{(4)}_{π+π−} /GeV

0.4 0.6 0.8 1 1.2 0.8 1.2 1.6 2 2.4 2.8

H1