W [GeV] σ(γp->2π+2π-p)[μb]

40 60 80 100

0.8

1.2

1.6 H1 data (HE) H1 data (LE) extra LE bin fit W^δ (δ=0.23+-0.02_{stat} +-0.06_{sys})

H1 Preliminary