[GeV] pγW 1 10^210 b]μ p) [ 0ρ→pγ(σ

0

5

10

15

20

25

30_{p = mYM}

data_{0.13} W ∝ fixed target H1 1996 ZEUS 1995, 1998

10 GeV

≤ _Y < M pm data

H1Preliminary_2

< 0.1 GeV 2Q < 1.53 GeV

-π^-π

0.28 GeV < m