0

5000

10000

15000

0 0.2 0.4

m_{γγ} [GeV/c^2]

N_{γγ} / (0.01 ⋅ GeV/c^2)

0

2500

5000

7500

10000

0 0.2 0.4

m_{γγ} [GeV/c^2]

0

500

1000

1500

0 0.2 0.4

m_{γγ} [GeV/c^2]

N_{γγ} / (0.01 ⋅ GeV/c^2)

0

500

1000

1500

0 0.2 0.4

m_{γγ} [GeV/c^2]