0

2

4

6

8

10

12

10^{-2} 10^{-1} x x G(x)

0

2

4

6

8

NLO QCD fit μ^2_f = 200 GeV^2

incl. k_⊥ algorithm

for α_s(M_z) = 0.1184 ± 0.0031

H1 jet data

CTEQ5M1 MRST99 Botje99