10^{-3}

10^{-2}

10^{-1}

1

10

10^2

10^3

10^4

10 10^2 10^3 10^4 10^5

H1 Neutral Current

Q^2 / GeV^2

F_2 ^p

x = 0.65_{( x 1)} x = 0.40_{( x 2)} x = 0.25_{( x 4)} x = 0.18_{( x 8)} x = 0.13_{( x 16)} x = 0.080_{( x 32)} x = 0.050_{( x 64)} x = 0.032_{( x 128)} x = 0.020_{( x 256)} x = 0.013_{( x 512)} x = 0.0080

( x 1024)

x = 0.0050

( x 2048)

x = 0.0032

( x 4096)

x = 0.0020

( x 8192)

x = 0.0013

( x 16384) H1 e −p H1 e^+p H1 e^+p low Q^2 ZEUS e^+p BCDMS NMC H1 97 PDF Fit