0

10000

20000

0.01 0.02 0.03 x_{IP} dσ / dx_{IP} ΜpbΝ

(a)

res. IP (H1 fit 2)

ACTW fit D res. IP (H1 fit 3)

0

10000

20000

0.01 0.02 0.03 x_{IP}

Saturation model

BJLW (qq only)

BJLW (k_{T,g}=1.5 GeV) BJLW (k_{T,g}=1.0 GeV) cut cut

0

10000

20000

0.01 0.02 0.03 x_{IP}

Semi-Cl. model SCI GAL H1 Data H1

0

100

200

300

-2 -1 log_{10}β dσ / dlog_{10}β ΜpbΝ

(b)

0

100

200

300

-2 -1 log_{10}β 0

100

200

300

-2 -1 log_{10}β

10

10^2

10^3

0.25 0.5 0.75 z_{IP} ^{obs} dσ / dz_{IP} ^{obs} ΜpbΝ

(c)

10

10^2

10^3

0.25 0.5 0.75 z_{IP} ^{obs}

10

10^2

10^3

0.25 0.5 0.75 z_{IP} ^{obs}