0 200 400 600

0.5 1 1.5 log_{10}Q^2 dσ / dlog_{10}Q^2 ΜpbΝ

(a)

res. IP (H1 fit 2)

ACTW fit D res. IP (H1 fit 3)

H1 Data

0 200 400 600

0.5 1 1.5 log_{10}Q^2

Semi-Cl. model SCI GAL H1

10

10^2

2 4 6 8 p_{T, D*}

* ΜGeVΝ dσ / dp_{T, D*}* Μpb/GeVΝ

(b)

10

10^2

2 4 6 8 p_{T, D*}

* ΜGeVΝ

0

100

200

-1 0 1 η_{D*} dσ / dη_{D*} ΜpbΝ

(c)

0

100

200

-1 0 1 η_{D*}