H1 Neutral Current Data

E_e' /GeV

Events

Q^2 > 150 GeV^2

E_e' /GeV

Events

Q^2 > 5000 GeV^2

θ_e / ^o

Events

H1 NC data MC (NC + bg) MC (bg)

E-P_z / GeV

Events

10^2

10^3

10^4

20 30 40 50 0 20 40 60 80 100

50 100 150 200

1 10 10^2

10^3

10^4

50 100 150 0 5000

10000

15000

20000

25000

20 40 60