H1 Neutral Current e^+p and e^-p High-y Data

E_e' /GeV

Events θ_e / ^o

Events

H1 NC e^+p data H1 NC e^-p data MC (NC)

E-P_z / GeV

Events

E_e' /GeV

Events

0 250 500 750 1000

1250

1500

1750

2000

2250

5 10 15 0 200 400 600 800 1000

1200

1400

1600

1800

80 100 120 140

0 200 400 600 800 1000

1200

20 40 60 80 0 20 40 60 80 100 120

6 8 10 12 14