0 2 4 6 8 10

-0.2 -0.1 0 0.1 0.2

ε/Λ^2 (TeV ^{-2}) χ^2−�χ^2_{min}

LL+RR

hipeplus_combi

Λ-=-2.71251

Λ+=5.17124