0 250 500 750 1000

1250

-2 -1 0

4.4 Γ Q^2 Γ 2 GeV^2

0 250 500 750 1000

1250

-2 -1 0

0 250 500 750 1000

1250

-2 -1 0

0 100 200 300 400

-2 -1 0

10 Γ Q^2 Γ 4.4 GeV^2

0 100 200 300 400

-2 -1 0

0 100 200 300 400

-2 -1 0

0 50 100 150

-2 -1 0

25 Γ Q^2 Γ 10 GeV^2

0 50 100 150

-2 -1 0

0 50 100 150

-2 -1 0

0 10 20 30

-2 -1 0

80 Γ Q^2 Γ 25 GeV^2 η^* � � 0 10 20 30

-2 -1 0

η^* � � 0 10 20 30

-2 -1 0

η^* � �

4 H1 data NLO JETVIP dir

NLO DISENT dir 0.1 Λ y Λ 0.25 0.25 Λ y Λ 0.5 0.5 Λ y Λ 0.85