0 20 40 60 80 100 120 140 160 180

0 50 100 150 200 250 300 350 not allowed

m(t^∼_1)=200 GeV m(t^∼_1)=265 GeV m(u^∼)=260 GeV m(u^∼)=275 GeV

m_0 (GeV) m_{1/2} (GeV)

D0 (j=1,2)

L3 limit

(a) μ < 0, A_0 = 0

mSUGRA, λ^, _{1j1} = 0.3, tanβ=2

M_{LSP} Λ M_b

H1 excluded for j=3 excluded for j=1,2

0 20 40 60 80 100 120 140 160 180

0 50 100 150 200 250 300 350