10^{-2}

10^{-1}

1

100 125 150 175 200 225 250 275

10^{-2}

10^{-1}

1

100 125 150 175 200 225 250 275

Unconstrained MSSM, k=1,2

tan β = 6 -300 < μ < 300 GeV 70 < M_2 < 350 GeV M_{LSP} > 30 GeV imposed

(a)

EXCLUDED

EXCLUDED IN PART OF PARAMETER SPACE

λ^, _{111} (ββ0ν) λ^, _{112} (CCU)

M_{squark} (GeV) λ^, _{11k}

H1